-- Auto-generated SQL script #202401231737
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.log.LogInfoManagerMainPanel'
	WHERE x.PLOID='C41AF7C4-1D19-00DF-1974-2542CDD49FFB';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.log.LogAuthorizeManagerMainPanel'
	WHERE x.PLOID='EBA630BC-71DF-AF03-F9CB-2F4DF14459AF';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.log.LogOperateManagerMainPanel'
	WHERE x.PLOID='674C5E77-501F-AE85-2B61-191711BDA57A';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.oq.QTDClient'
	WHERE x.PLOID='D7D644FC-8CFB-0155-F365-D9FF5571482F';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.oq.QTClient'
	WHERE x.PLOID='88EF9678-090F-069C-AF01-D13BDFB22923';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.attribute.AttributeMainPanel'
	WHERE x.PLOID='F6768618-D0D0-301A-CF96-F68C235AA119';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.attrrule.AttrRulePanel'
	WHERE x.PLOID='4D64D017-E578-9A1D-97C7-12BECF7DFD67';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.volumn.PvolumePanel'
	WHERE x.PLOID='663365A6-0D37-831A-8244-2320E47F33B5';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.stafforgmanage.CombinationTablePanel'
	WHERE x.PLOID='20D63A69-C6BC-8519-8B2B-E5ACFEA62394';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.log.LogInfoMainPanel'
	WHERE x.PLOID='08CA535A-8170-5EAF-9E4F-524ECA5A55F0';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.stafforgmanage.UserTablePanel'
	WHERE x.PLOID='3B8BF650-AB83-FAED-44A7-5D6848E7284D';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.stafforgmanage.DeptTablePanel'
	WHERE x.PLOID='CD48B58C-F9CE-2283-FAB2-AED087950C03';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.stafforgmanage.RoleTablePanel'
	WHERE x.PLOID='1B4A4C77-B61E-BE01-8E6A-535A7523D435';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.stafforgmanage.PasswordStrategyTablePanel'
	WHERE x.PLOID='2E11F0B1-F601-CF56-32E5-B7CF25972DBC';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.workflow.template.ProcessCustomTypePanel'
	WHERE x.PLOID='E955AD13-DD7E-E02B-5473-86AF9C432CF9';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.workflow.template.ProcessCustomDataPanel'
	WHERE x.PLOID='DF575169-86F0-A6CA-12FF-D312DA63AF27';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.log.LogAuthorizeMainPanel'
	WHERE x.PLOID='ECDEDCCC-5801-3517-11F0-171460ACBB21';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.log.LogOperateMainPanel'
	WHERE x.PLOID='A2EDA2E4-9FBF-2446-B143-B21FA5E6B6E5';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.rightdistribution.roleRight.RoleRightPanel'
	WHERE x.PLOID='53C7CD63-6917-1992-8BE7-0CAEE40E8143';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.attrGroup.AttributeGroupPanel'
	WHERE x.PLOID='6D09C32A-9804-9A59-01F5-0A5B21E99E15';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.log.LogBasicConfPanel'
	WHERE x.PLOID='24D3E679-EB7D-A95F-0CAD-B6B99123A83B';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.rightdistribution.roleRight.BSTypeRoleRightPanel'
	WHERE x.PLOID='BFF51696-8B08-B45B-D44E-EF1D25388017';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.specialCharacter.SpecialCharacterPanel'
	WHERE x.PLOID='8764DECB-B8E3-53A5-9FA0-DA856E13C013';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.stafforgmanage.CombinationValueTablePanel'
	WHERE x.PLOID='E44A10BF-FFDD-6E3A-A564-8527F3E33E3C';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.portal.NewNewUI.actionmng.ActionConfPanel3'
	WHERE x.PLOID='297F590A-0D96-AEE7-2FF6-B004D750FC58';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.portal.platformPortal.PlatformPortalClientMain'
	WHERE x.PLOID='B4FDF8FC-A62D-004A-1A53-D1FDEF699562';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.portal.UI.v3.UIFManager'
	WHERE x.PLOID='13EF1F72-9987-E1A7-AED4-33C9DA7D34C2';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.auth2.view.GrandPermissionClient'
	WHERE x.PLOID='930E0B00-AAE5-59E3-C274-F2342D2252BD';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.omd.btm.ui.BtmClient'
	WHERE x.PLOID='7D5BF5B1-066E-DA29-B979-E47CD7229A67';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.omd.statepool.StatePoolStart'
	WHERE x.PLOID='DB858441-243C-B7E0-2531-D77D99290FB3';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.omd.attribpool.ui.APClient'
	WHERE x.PLOID='670872C8-643E-3C92-7A0C-273DF7D7CDFF';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.omd.lifecycle.LifeCycleStart'
	WHERE x.PLOID='C85B58FA-3B40-CB7E-22DC-789F124F0A24';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.omd.linktype.LinkTypeStart'
	WHERE x.PLOID='B108DD97-57EF-45C0-ED37-950C7111293E';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.omd.enumManager.ui.EnumClient'
	WHERE x.PLOID='E8A7DF55-4DC5-9088-46FD-B9CDB10C37F8';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.omd.versionrule.VRClientStart'
	WHERE x.PLOID='8F2F31B2-D7D2-9948-9AA1-E23EA9AD9B17';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.specialCharacter.SpecialCharacterClassificationPanel'
	WHERE x.PLOID='8EB1EF7B-EA5D-7691-C3D7-BF51CE71DD4F';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.attrRange.AttrRangePanel'
	WHERE x.PLOID='EA8151F1-99CD-73DE-1A8F-A4894B5D45E9';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.stafforgmanage.MachSecurityPanel'
	WHERE x.PLOID='4B6F5053-B912-D6DF-52BA-C8DC02EC2831';
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.framework.systemConfig.secretGrade.OpenOrCloseConfigForUserAndPcPanel'
	WHERE x.PLOID='FE76669D-F6A2-FB3D-1AEC-2E5D5289118F';
-- Auto-generated SQL script #202401231758
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.oq.QTClientForLink'
	WHERE x.PLOID='4B7C8D44-7952-2DE2-320A-4D33FC180704';
-- Auto-generated SQL script #202401231800
UPDATE PLFUNCTION x
	SET x.PLRESOURCEC='com.vci.client.auth2.view.TypeActionClient'
	WHERE x.PLOID='3C006CDC-1B96-AB48-D138-EE137CE16419';
